LIST OF DIRECTORY ASSISTANCE FUNCTION KEYS
F1 Key:      Displays this help screen
F2 Key:      Changes Directory to user selection: CD\ (awaits sel)
F3 Key:      Changes to DOS directory (Used after F2 Key)
F4 Key:      Changes to BASICA directory
F5 Key:      Changes to the Root directory
F6 Key:      Dir/W
F7 Key:      Changes to UTIL directory/ also initiates UTIL function keys
F8 Key:      Changes to LOTUS directory
F9 Key:      Changes to ENABLE directory
F10 Key:     Redefinition Command
Alt F1 key:  Smaller help screen
Alt F2 key:  Changes to the Selected D1 directory
Alt F3 key:  Changes to the TEMP directory
Alt F4 key:  Displays MD\
Alt F5 key:  Changes to the BATCH directory
Alt F6 key:  Changes to the ZSTEM directory
Alt F7 key:  Changes to the ENDATA directory
Alt F8 key:  Changes to the Func Directory
Alt F9 key:  Initials the Key function command: no help screen; same direc
Alt F10 key: Changes to the Subdirectory Redefinition Setup
